MC Farm Problems

h Changed from short to long tapes h Changed from Oracle 6 to Oracle 7 (and back) h $SYS1 disk filled up twice

> No VAX system manager h SCSA2 hung up - could not restart

> No VAX system manager h SLACVX fan replacment

> First time SLACVX has had hardware problem in year h Ran out of disk space once (need more money) h Must compete with user jobs h Ran out of tapes once

Changes coming

h Documentation updated and expanded h Jeff Snyder taking over day-to-day operation (effective Monday) h Need to get Tony ISDN (need more money) h Need to organize bi-weekly MC farm usage meetings