Net Uncertainty (exc. R_c ω ev-sel) Statistics R_cΑ0.06 udsc Physics Sys. (exc. R_c) Correlation Systematic Detector Systematics

SLD Preliminary 97-98

Neural Net c-b separation

ΔR_b/R_b (%)

0

0.5

1

1.5

2

2.5

3

0 0.1 0.2 0.3 0.4 0.5 0.6 0.7 0.8 0.9