Neural Net c-b separation tag efficiency/purity

90.9

86.3

81.9

77.7

72.9

9.7 15.5

18.7 21

22.5

Π_c ε_c(data) ε_c ε_b ε_{uds} ε_c=17.4%

Π_c=84.5%

SLD Preliminary 97-98 data

0

0.2

0.4

0.6

0.8

1

0.1 0.15 0.2 0.25 0.3 0.35 0.4 0.45 0.5 0.55 0.6