Neural Net c-b separation tag efficiency/purity

75.6 83.7

88.2 91.5

94.5 96.5

97.7

98.5

99.1

72.3 71.7 70.5 69.1 67.4 65.5 63.5 61.1 57 Π_b ε_b(measured) ε_b ε_c ε_{uds} ε_b=61.7%

Π_b=98.3%

SLD Preliminary 97-98 data

0

0.2

0.4

0.6

0.8

1

0 0.1 0.2 0.3 0.4 0.5 0.6 0.7 0.8 0.9