Mass(GeV/c^2)

Net Uncertainty (exc. R_c) Statistics R_cΑ4% udsc Physics Sys. (exc. R_c) Correlation Systematic Detector Systematics

Preliminary 96

ΔR_b/R_b*100

0 0.5 1 1.5 2 2.5 3 3.5 4 4.5 5

0 0.5 1 1.5 2 2.5 3