Mass Cut(GeV/c^2)

80.4

83.3

90.5 97.6

98.5 98.7

64.1 61.6 55.5

47.9 38.3

27.8 ε_b ε_c ε_{uds} ε_b(measured) Π_b

SLD Preliminary 96 data only

0 0.1 0.2 0.3 0.4 0.5 0.6 0.7 0.8 0.9 1

0 0.5 1 1.5 2 2.5 3