EVENT SAMPLE

Data Set Collected at the Stanford Linear Collider (SLC) • 1993 Data Run - 50,000 Z’s with P_e ∼ 63% • ’94-’95 Data Run - 100,000 Z’s with P_e ∼77%

• 1996 Data Run - 50,000 Z’s with P_e ∼77% ⇒ New VXD still being aligned