Bd MIXING MEASUREMENT

Unique Features of SLD/SLC Program:

ffl Beam Polarization ) Initial State Tag

ffl Small and Stable SLC Beam Spot ) Well Defined B Production Point

ffl High Resolution 3-D Vertex Detector ) Excellent Decay Length Resolution

ffl Excellent Particle ID with CRID ) (another) Final State Tag